50 55

05 10 15 20 25 30 35 40 45 50 55 00

50

50 55

50 55

Tiempo (s)

Acel. Max. 2.5 Int JMA: 3

Acel. Max. 2.5 Int JMA: 3

Acel. Max. 2.4 Int JMA: 2

Acel. Max. 2.4 Int JMA: 2

Acel. Max. 0.8 Int JMA: 1

OV-Torre Alta

Fraijanes UCR

Fraijanes N00 UCR

OV-Las Cruces, Puntarenas

Teatro Nacional