55 00 05 10 15 20 25 30 35 40 45 50

50 55 00 05 10 15 20 25 30 35 40 45

55 00 05 10 15 20 25 30 35 40 45

45 50 55 00 05 10 15 20 25 30 35 40

50 55 00 05 10 15 20 25 30 35 40 45

Tiempo (s)

Acel. Max. 2.3 Int JMA: 2

Acel. Max. 2.3 Int JMA: 2

Acel. Max. 1.9 Int JMA: 2

Acel. Max. 1.6 Int JMA: 2

Acel. Max. 0.0 Int JMA: 0

F. Naranjo,Corredores

Laurel, Corredores

Col Pto Jimenez

Hosp C. Neily

Teatro Nacional