30 35 40 45 50 55 00 05 10 15 20 25

30 35 40 45 50 55 00 05 10 15 20 25

30 35 40 45 50 55 00 05 10 15 20 25

30 35 40 45 50 55 00 05 10 15 20 25

30 35 40 45 50 55 00 05 10 15 20 25

Tiempo (s)

Acel. Max. 0.0 Int JMA: 0

Acel. Max. 0.0 Int JMA: 0

Acel. Max. 0.0 Int JMA: 0

Acel. Max. 0.0 Int JMA: 0

Acel. Max. 0.0 Int JMA: 0

San Miguel

San Rafael Oreamuno

Cartago

Bomberos Puriscal

Teatro Nacional