45 50 55 00 05 10 15 20 25 30 35 40

50 55 00 05 10 15 20 25 30 35 40 45

50 55 00 05 10 15 20 25 30 35 40 45

50 55 00 05 10 15 20 25 30 35 40 45

45 50 55 00 05 10 15 20 25 30 35 40

Tiempo (s)

Acel. Max. 0.8 Int JMA: 1

Acel. Max. 0.8 Int JMA: 1

Acel. Max. 0.0 Int JMA: 0

Acel. Max. 0.0 Int JMA: 0

Acel. Max. 0.0 Int JMA: 0

Clinica Turrubares

Orotina

Ebais Cd. Colon

Puerto Caldera

Teatro Nacional